-- phpMyAdmin SQL Dump
-- version 3.5.2.2
-- http://www.phpmyadmin.net
--
-- Host: 127.0.0.1
-- Erstellungszeit: 01. Jul 2013 um 16:39
-- Server Version: 5.5.27
-- PHP-Version: 5.4.7

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

--
-- Datenbank: `geodb`
--

--
-- Daten für Tabelle `domain`
--

INSERT INTO `domain` (`id`, `name`) VALUES
(1, 'public'),
(2, 'private');

--
-- Daten für Tabelle `information`
--

INSERT INTO `information` (`id`, `name`) VALUES
(1, 'address'),
(2, 'Telefon'),
(3, 'name'),
(4, 'typ');

--
-- Daten für Tabelle `place`
--

INSERT INTO `place` (`id`, `plan`, `parent`) VALUES
(121799787, 0x0000000001030000000100000005000000f6f708ebb5a32c40c74043a44be249407100fdbe7fa32c40c7681d554de249400f45813e91a32c404f35c4c25ae24940e73ae86dc7a32c404f0dea1159e24940f6f708ebb5a32c40c74043a44be24940, NULL),
(127003463, 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, NULL),
(127010188, 0x000000000103000000010000000b000000d447e00f3fa32c4087927f1c83e2494017d9cef753a32c40c368b16f82e249401d26755d53a32c40b2a19bfd81e24940161e8f7461a32c40e19b018981e24940957f2daf5ca32c40c0a37cf77de24940529ca38e8ea32c4073b0485d7ce24940a79201a08aa32c401be7806e79e24940db49e93ea5a32c40c8d4b89278e2494001608610a1a32c408e249c7175e2494028017b9631a32c4098da520779e24940d447e00f3fa32c4087927f1c83e24940, NULL),
(127010189, 0x0000000001030000000100000005000000d60ffb4edda22c40f4684f6e80e24940ebe005b6efa22c408323377980e24940f09d3d3cf0a22c40cd15ef117be24940dccc32d5dda22c403e5b07077be24940d60ffb4edda22c40f4684f6e80e24940, NULL),
(127010192, 0x0000000001030000000100000005000000bcc96fd1c9a62c40b15e56725fe249408adbb28d89a62c407bfda43561e24940647d5e4c8ea62c40c6fe0d3565e24940966b1b90cea62c40921f967263e24940bcc96fd1c9a62c40b15e56725fe24940, NULL),
(127010225, 0x00000000010300000001000000050000001c8bb7dfeba52c405a5bc2eb44e2494035ad5e8fd3a52c4095fda9a745e24940b4739a05daa52c40866b5ace4ae249409c51f355f2a52c404bc972124ae249401c8bb7dfeba52c405a5bc2eb44e24940, NULL),
(127010228, 0x0000000001030000000100000006000000d725f44421a72c4099cb571355e24940526cbbbf30a72c408d68965f61e2494027abd84e4aa72c40c30bc79860e24940ac6411d43aa72c40642e5f4d54e24940acff73982fa72c40db029da454e24940d725f44421a72c4099cb571355e24940, NULL),
(129140556, 0x0000000001030000000100000005000000eb8b84b69ca72c40aebc3f3965e2494006aa3583aea72c40eac083b064e24940c1f572e9a9a72c40dad7cb0061e24940a6d7c11c98a72c4033935e8a61e24940eb8b84b69ca72c40aebc3f3965e24940, NULL),
(129140566, 0x0000000001030000000100000007000000bd8dcd8e54a72c409a92510a5fe24940735996f958a72c409810189062e249405f7ea7c98ca72c406f97a20161e24940d0251c7a8ba72c403a9e85f35fe24940d4241d8aa7a72c403b8a181b5fe24940ffaf3a72a4a72c4071056fa35ce24940bd8dcd8e54a72c409a92510a5fe24940, NULL),
(129258388, 0x000000000103000000010000000d000000eda7b51fdfa42c40ddcdf863ffe14940567a127de3a42c4082be3e8402e24940963bd807fea42c405e3013a001e24940fccd7ae706a52c40f0051cf807e24940065ed2bdf3a42c40e4b3869c08e24940bd299b28f8a42c40839fddc60be24940e8aad4473ba52c40ae3e688709e2494091e744cc36a52c40a917d75306e24940761c3f541aa52c40d9ddf24707e249400985ad7e11a52c4017844df800e24940e0bbcd1b27a52c409b20ea3e00e2494077e970be22a52c401faf5120fde14940eda7b51fdfa42c40ddcdf863ffe14940, NULL),
(129357942, 0x00000000010300000001000000070000005fc834e4e9a62c40a78b5e57dde149405f679eb70ca72c40665a5139dce149400f2a711de3a62c402eb022febce149406289624dc0a62c40da21591bbee149408b1c7d27c1a62c40cecfc3bfbee14940bf092a4fc5a62c4020c2aedcc1e149405fc834e4e9a62c40a78b5e57dde14940, NULL),
(129357943, 0x000000000103000000010000000d000000cf38c3c36aa62c4051c3126ae1e1494017cca9ae8da62c407bd22e4be0e14940d8648d7a88a62c40e3056c62dce1494053b93fcd7fa62c408186edddd5e14940dc7f643a74a62c40a9dc442dcde149401cea77616ba62c409a2d0f88c6e149401a8dd71764a62c4044280010c1e14940d3f9f02c41a62c401a19e42ec2e149407c53477d48a62c4058dc24abc7e149407dd8c17751a62c40027e326bcee14940a71831fd5ca62c404b6df310d7e1494061f1e54f65a62c40008fa850dde14940cf38c3c36aa62c4051c3126ae1e14940, NULL),
(129357944, 0x0000000001030000000100000005000000afc9bf3b9ea72c40d5d63ed301e24940449ec9a3c0a72c407d6363b900e24940a76730fc96a72c408d7f9f71e1e14940be94cb9074a72c407ab2518ce2e14940afc9bf3b9ea72c40d5d63ed301e24940, NULL),
(129357945, 0x000000000103000000010000000500000055d746e11fa72c406ed113e005e24940027855b142a72c402da006c204e249406441bc0919a72c40d27b197be5e14940b8a0ad39f6a62c407eed4f98e6e1494055d746e11fa72c406ed113e005e24940, NULL),
(129357946, 0x0000000001030000000100000009000000c647d5c0a0a62c408449f1f109e2494060d916afc3a62c40d8d7bad408e24940b80f2f3ebba62c400541367f02e24940a43330f2b2a62c40615c6045fce149403854e7acaaa62c40a635bc0ff6e1494089851046a2a62c40799bedc0efe149401ca6c7009aa62c407db3cd8de9e149408214861277a62c40292504abeae14940c647d5c0a0a62c408449f1f109e24940, NULL),
(129357947, 0x00000000010300000001000000050000009613a39d89a72c4078503f5efee14940a55c2beb48a72c407d073f7100e249402c4833164da72c40b7b75b9203e249401dffaac88da72c40b2005c7f01e249409613a39d89a72c4078503f5efee14940, NULL),
(129357949, 0x0000000001030000000100000005000000dd60a8c30aa72c40b142db7b02e249403a330bfec8a62c400f2b37ac04e24940fc08b254cda62c40205ca6cb07e249409f364f1a0fa72c40c2734a9b05e24940dd60a8c30aa72c40b142db7b02e24940, NULL),
(129357950, 0x00000000010300000001000000050000006635b808e7a62c40e8b17790e8e149406327bc04a7a62c4094371b86eae14940082c6ffdaaa62c40516a2fa2ede149400b3a6b01eba62c403aa462adebe149406635b808e7a62c40e8b17790e8e14940, NULL),
(129357951, 0x00000000010300000001000000090000008b1c7d27c1a62c40cecfc3bfbee1494074c300d3b3a62c406319d12cbfe149404e6f905a72a62c40790db045c1e14940b961ca7674a62c4007c25fddc2e149402f5ee27e76a62c4060bf7163c4e149407c3e6fcf98a62c40074c9649c3e1494094394ceabaa62c406d173f32c2e14940bf092a4fc5a62c4020c2aedcc1e149408b1c7d27c1a62c40cecfc3bfbee14940, NULL),
(129357952, 0x0000000001030000000100000006000000c06db76e94a62c405a0ef450dbe1494059688c7b98a62c40ac5c03b6dee14940007b3b78dca62c407d5468c5dce149406880666bd8a62c402c065960d9e14940f25b74b2d4a62c40c6f8307bd9e14940c06db76e94a62c405a0ef450dbe14940, NULL),
(145126872, 0x00000000010300000001000000060000007f69519fe4a62c40c2a0f1e956e24940faaf181af4a62c40217e593563e24940cfee35a90da72c40ebe0606f62e2494054a86e2efea62c408c03f92356e24940c632fd12f1a62c40e690798956e249407f69519fe4a62c40c2a0f1e956e24940, NULL),
(145126874, 0x00000000010300000001000000060000004bbb873a62a72c409bc35a2151e249405ab2744f68a72c40635639fe55e249400ac50c439aa72c4087d62f7d54e24940fccd1f2e94a72c40bf4351a04fe249406ee81cf285a72c40e94c350e50e249404bbb873a62a72c409bc35a2151e24940, NULL),
(145126875, 0x0000000001030000000100000015000000ac860ecbb0a72c408a7846b64ee249409e842dd1b4a72c4065202ae851e249406df82702e6a72c40725e526b50e24940bac6c26bf2a72c4001b221495ae24940f8718f00c9a72c40199293895be24940f6f708ebb5a72c4000080e1e5ce249409a249694bba72c40fec753a060e2494010fae307f8a72c4094313ecc5ee249406f72ae17f9a72c409445aba45fe24940c50a6def09a82c40e186ce215fe2494076977accf6a72c407edef9ea4fe24940ba731717fda72c40c57652ba4fe24940c875f810f9a72c40ebce6e884ce24940fa916cbfc6a72c4043cc800e4ee249401fd0e341c4a72c408609fe124ce249401a8634cfb6a72c409dd5027b4ce249405768d608b3a72c40f7065f984ce249400fe4ea11b4a72c40799dc36b4de24940acebab06bca72c4008fc862e4de24940cf31207bbda72c4085e920544ee24940ac860ecbb0a72c408a7846b64ee24940, NULL),
(145128359, 0x000000000103000000010000000b00000098c349f5f8a42c40cd00bcaa58e24940a1061dbe96a52c4034f279c553e2494014f93fd186a52c405e9cf86a47e2494017789384e9a42c40a3acdf4c4ce24940e50f6157eea42c40964eda0a50e24940cfc4cfdac8a42c40faf9a53451e2494067e77e98cea42c401601a9a855e2494054ade012dba42c407bb2ac4555e2494038b41204d9a42c409affa1aa53e249400179c086f1a42c40b86004e852e2494098c349f5f8a42c40cd00bcaa58e24940, NULL),
(145128360, 0x0000000001030000000100000007000000a05b9ebde9a42c40023addc36fe249400fc86f1b57a52c407b34304d6ce24940c5e6e3da50a52c407813d78c67e2494057cad70a3fa52c4077cb1f1d68e249403701e19e42a52c40db70b3d36ae24940e3b2c00de7a42c40cefe40b96de24940a05b9ebde9a42c40023addc36fe24940, NULL),
(145128365, 0x000000000103000000010000000700000004eb93371ba62c40a7295d5551e24940144a157b1ea62c40a1f65b3b51e2494026231dd434a62c40604f858950e24940f065474f36a62c403cd5c67d50e249400b2d46b824a62c40252026e142e249401fb292a009a62c409074bcb843e2494004eb93371ba62c40a7295d5551e24940, NULL),
(145128368, 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, NULL),
(145128369, 0x000000000103000000010000000d000000bd35b05582a52c4093b53cc560e24940787709f3c3a52c40f33977bb5ee2494031cb434bc3a52c40ffb91e3b5ee24940f645425bcea52c40f4250ae35de249403df20703cfa52c40e8a562635ee24940b15fc1470ea62c4012a1116c5ce24940bce4243905a62c407be0be6955e2494047776bf4c5a52c4050e50f6157e249407d1464bac6a52c40b5d892fa57e24940b89965aabba52c40c16ca75258e2494083fc6ce4baa52c405c7924b957e24940c8ba134779a52c40fcf4e9c259e24940bd35b05582a52c4093b53cc560e24940, NULL),
(145128371, 0x000000000103000000010000000600000061bb20c77ba62c4007bd923f73e24940a872da5372a62c4046216ef36be2494047e5266a69a62c40f04fa91265e249406e426b8f28a62c40e9ceb81567e24940351a0ae93aa62c406b7ccb4175e2494061bb20c77ba62c4007bd923f73e24940, NULL),
(145128378, 0x0000000001030000000100000005000000c3842c66dfa42c408c7c033862e24940ee1e454200a52c40d400ef2e61e249400e78aa8dfba42c40ca4a38995de2494090df36aedaa42c4082c64ca25ee24940c3842c66dfa42c408c7c033862e24940, NULL),
(145128379, 0x0000000001030000000100000005000000144a157b1ea62c40a1f65b3b51e2494095302eb022a62c40f316597c54e24940540bdb0539a62c40b16f82ca53e2494026231dd434a62c40604f858950e24940144a157b1ea62c40a1f65b3b51e24940, NULL),
(145128380, 0x0000000001030000000100000007000000562eafb728a62c4024ca83995be24940e05d786f56a62c40d2ff722d5ae2494097e4805d4da62c407c009c2853e24940540bdb0539a62c40b16f82ca53e2494095302eb022a62c40f316597c54e249400eb5b7a51fa62c40cfcaac9454e24940562eafb728a62c4024ca83995be24940, NULL),
(145130526, 0x000000000103000000010000000d000000c71d256541a32c40bd29f6e16ae2494052ea37b819a32c40e04158326ce24940d2b0732e20a32c406dea97e370e24940813a8a181ba32c401415600e71e2494086af0a2f1ca32c40c62f61d971e24940cb6ec1ad16a32c4055185b0872e24940873f790e1ba32c4047020d3675e249402004899235a32c40e2b2655474e24940c8201c5833a32c40ad0100b672e2494040ea65ca3da32c40a26deb5d72e249405e4bc8073da32c4061f426d071e24940cea78e554aa32c4079acbe5f71e24940c71d256541a32c40bd29f6e16ae24940, NULL),
(145130527, 0x000000000103000000010000000a000000b14170a653a42c4050734ddc85e249408e2feb0fdea42c40a0ac736781e249401fc830dddaa42c40f59c99057fe249401a2bd615d8a42c405b26c3f17ce24940fbd467bdcea42c40d8ffef3e7de249402df5e27acaa42c40436e2b627de24940c4e4b27680a42c40ee7d05c47fe24940bfedae5868a42c40b8dad48a80e249403d3d5bac4da42c400bed9c6681e24940b14170a653a42c4050734ddc85e24940, NULL),
(145130528, 0x00000000010300000001000000050000004ab8904770a32c409198a0866fe2494079da2b3de4a32c40f3f400cc6be2494067b96c74cea32c401f97827f5be249403797d17e5aa32c40bd3a223a5fe249404ab8904770a32c409198a0866fe24940, NULL),
(145130529, 0x000000000103000000010000000b0000009938a8b349a42c4054ed89647ee2494073ec455964a42c402b5a6f8a7de24940cce1a47a7ca42c40f6bc76c47ce249400c080841a2a42c400257c38f7be249404912842ba0a42c405c6045fc79e2494021bc2cdca8a42c40f1c3f7b479e24940ae72576595a42c404c12f0106be24940d6c8aeb48ca42c40b7ae3d586be24940f0c979b592a42c40dfed30dc6fe249402afcbe243aa42c40c543ceb172e249409938a8b349a42c4054ed89647ee24940, NULL),
(145130530, 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, NULL),
(145130531, 0x000000000103000000010000000900000077082d358ca42c4054c72aa567e249401a6f8676a9a42c404e80bcb266e24940202cbefca9a42c407e8e8f1667e24940240ed940baa42c40e311818f66e24940725de795a1a42c4099b7ea3a54e249402182604491a42c40c9f3cfc254e24940bb2c81ef91a42c4093f47a4155e2494065bf93bb74a42c40983be93356e2494077082d358ca42c4054c72aa567e24940, NULL),
(145130532, 0x00000000010300000001000000080000008e48caccbba42c403effe2be7ae2494035f2d47ec6a42c40326bce667ae24940b0d3febdcaa42c40c7fc92437ae249402228c819d4a42c404b2366f679e249400e2cec0ecea42c40b8a3497375e249403f575bb1bfa42c40823f57b66ae24940aa775d64a7a42c40761bd47e6be249408e48caccbba42c403effe2be7ae24940, NULL),
(145130533, 0x0000000001030000000100000005000000c01f234509a32c408a3c49ba66e2494081f6d9b749a32c40f6ca619c64e2494012e5c1cc2da32c40a1b4dc3e50e24940fe0fb056eda22c40a066ed5b52e24940c01f234509a32c408a3c49ba66e24940, NULL),
(145130541, 0x0000000001030000000100000005000000fa9573cef4a32c403a234a7b83e249403de2a139fca32c402b91faa188e24940328518f906a42c40e440594288e2494042374591ffa32c4087927f1c83e24940fa9573cef4a32c403a234a7b83e24940, NULL),
(145130542, 0x0000000001030000000100000005000000c4e4b27680a42c40ee7d05c47fe24940cce1a47a7ca42c40f6bc76c47ce2494073ec455964a42c402b5a6f8a7de24940bfedae5868a42c40b8dad48a80e24940c4e4b27680a42c40ee7d05c47fe24940, NULL),
(145130543, 0x0000000001030000000100000005000000fbd467bdcea42c40d8ffef3e7de24940b0d3febdcaa42c40c7fc92437ae2494035f2d47ec6a42c40326bce667ae249402df5e27acaa42c40436e2b627de24940fbd467bdcea42c40d8ffef3e7de24940, NULL),
(145130544, 0x000000000103000000010000000500000054b99a86f2a32c40d66949ec7fe249407c2cd8a1f5a32c40703c444882e24940302878afffa32c40a064bcf781e249405bb39597fca32c4071d2ea9a7fe2494054b99a86f2a32c40d66949ec7fe24940, NULL),
(145132458, 0x000000000103000000010000000b00000054d44fee2da72c406244471740e2494017128b732fa72c4073f1b73d41e249407492527534a72c40484cf50945e24940126745d444a72c406c0e6b8544e24940fecf06054aa72c4058d9887148e24940a1eea8d667a72c40e751f17f47e249405c829dac62a72c407804dc9843e249406591819774a72c40784c930843e24940fc06dca96fa72c401b6a6f4b3fe249409ed6c8096ea72c4016c7dc103ee2494054d44fee2da72c406244471740e24940, NULL),
(145132460, 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, NULL),
(145132464, 0x00000000010300000001000000050000002e0f88c6c9a72c40c04d356909e24940b225506969a72c40d6b1a5a20ce24940b6a2cd716ea72c40f2a43b3e10e24940848a60d2cea72c40dc40cb040de249402e0f88c6c9a72c40c04d356909e24940, NULL),
(145271897, 0x000000000103000000010000000a000000528d4de1f7a52c4082b9cc9f25e24940b15bba38e0a52c40105a0f5f26e24940c7777302e4a52c401b2a6b4029e24940aaaa86b311a62c402163a4cd27e24940eac5f59441a62c4087a4164a26e24940d4a93ccb3da62c407dd4ba6823e24940ed832c0b26a62c4035f4aa2924e249406700b90e1fa62c404458e8de1ee24940200835e8f0a52c4025dde05520e24940528d4de1f7a52c4082b9cc9f25e24940, NULL),
(145271902, 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, NULL),
(145271906, 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, NULL),
(145271909, 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, NULL),
(145271910, 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, NULL),
(145271920, 0x000000000103000000010000000a000000b52ca924fca42c4024c67c8a2de2494014fb157ce4a42c40dce56c4b2ee249402a17cf45e8a42c4052f6f12b31e24940ef30372916a52c409af0a6b62fe24940fa66f6d445a52c4095f1ef332ee24940e44a3d0b42a52c401fe16a532be24940fc242d4b2aa52c40434184132ce2494077a1b94e23a52c40e66498c926e249402fa93528f5a42c40c8e9904028e24940b52ca924fca42c4024c67c8a2de24940, NULL),
(145280191, 0x000000000103000000010000000d0000000755b4835ba42c4053f9e81e23e249404caebdaa0ea42c4040f850a225e2494075c35b8c26a42c403d73203537e249408ea152db3ca42c4097900f7a36e24940458df8043fa42c404ec46c1338e24940c59ff2f972a42c40915d0e6036e2494067b796c970a42c40862b56c334e24940dd6bf76173a42c4068b686ad34e24940229e36f460a42c40c879ff1f27e249406acf76966aa42c40f8a177cf26e24940a8b118d066a42c40f4041d0824e249405f80d82d5da42c40c4dca45824e249400755b4835ba42c4053f9e81e23e24940, NULL),
(145280193, 0x0000000001030000000100000010000000ffe7d5a5eba62c40179348ec24e2494010b3f2261aa72c40f44cd47723e24940525ed0e748a72c40a787b20122e24940dea1725d42a72c40cd89e2fa1ce24940705a95e93ca72c400be24dc818e2494033eb7bc333a72c40cd2445bf11e249406fe305c71ba72c40f1845e7f12e249409e94ee53faa62c40673ff78a13e24940c2a38d23d6a62c40902e36ad14e24940e3f1fe89dba62c40ed9a90d618e2494029a9b816d2a62c4041f50f2219e24940bf43f6e6dca62c40d14e177321e249408c5940b2caa62c40fb850d0522e249404a021e62cda62c4041fe881524e24940a604696be9a62c40716eb83423e24940ffe7d5a5eba62c40179348ec24e24940, NULL),
(145280204, 0x0000000001030000000100000005000000d8d825aab7a62c40ed2d403624e24940244223d8b8a62c40b285200725e24940c59e8724c4a62c40edb776a224e2494079358af6c2a62c40296096d123e24940d8d825aab7a62c40ed2d403624e24940, NULL),
(145280213, 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, NULL),
(149292698, 0x00000000010300000001000000050000002a8afc9f68a72c40505b7e3be4e14940456dd1b826a72c402560cf32e6e14940d862b7cf2aa72c401d7d827ae9e14940bc7fe2b66ca72c40dd370884e7e149402a8afc9f68a72c40505b7e3be4e14940, NULL),
(177247686, 0x00000000010300000001000000050000005305a3923aa52c406707019e59e249401d6f97a201a52c400d2c91555be249403608ce740aa52c40bc2eb25362e249406c9ed96443a52c40814a4b9b60e249405305a3923aa52c406707019e59e24940, NULL),
(221803079, 0x0000000001030000000100000005000000d9bc602640a72c405d91f359f9e14940972f794d59a72c40da28a1aaf8e14940aa166c7e57a72c40e133c813f7e14940eca353573ea72c40639c1ac3f7e14940d9bc602640a72c405d91f359f9e14940, NULL);

--
-- Daten für Tabelle `placealias`
--

INSERT INTO `placealias` (`aid`, `pid`, `alias`) VALUES
(5, 129140556, '129140556'),
(6, 129140566, '129140566'),
(7, 129357942, '129357942'),
(8, 129357943, '129357943'),
(9, 129357944, '129357944'),
(10, 129357945, '129357945'),
(11, 129357946, '129357946'),
(12, 129357947, '129357947'),
(13, 129357949, '129357949'),
(14, 129357950, '129357950'),
(15, 129357951, '129357951'),
(16, 129357952, '129357952'),
(17, 121799787, '121799787'),
(18, 127003463, '127003463'),
(19, 127010188, '127010188'),
(20, 127010189, '127010189'),
(21, 127010192, '127010192'),
(22, 127010225, '127010225'),
(23, 127010228, '127010228'),
(24, 145126872, '145126872'),
(25, 145126874, '145126874'),
(26, 145126875, '145126875'),
(27, 145128359, '145128359'),
(28, 145128360, '145128360'),
(29, 145128365, '145128365'),
(30, 145128368, '145128368'),
(31, 145128369, '145128369'),
(32, 145128371, '145128371'),
(33, 145128378, '145128378'),
(34, 145128379, '145128379'),
(35, 145128380, '145128380'),
(36, 145130526, '145130526'),
(37, 145130527, '145130527'),
(38, 145130528, '145130528'),
(39, 145130529, '145130529'),
(40, 145130530, '145130530'),
(41, 145130531, '145130531'),
(42, 145130532, '145130532'),
(43, 145130533, '145130533'),
(44, 145130541, '145130541'),
(45, 145130542, '145130542'),
(46, 145130543, '145130543'),
(47, 145130544, '145130544'),
(48, 145132458, '145132458'),
(49, 145132460, '145132460'),
(50, 145132464, '145132464'),
(51, 149292698, '149292698'),
(52, 221803079, '221803079'),
(53, 177247686, '177247686'),
(54, 145280191, '145280191'),
(55, 145280193, '145280193'),
(56, 145280204, '145280204'),
(57, 145280213, '145280213'),
(58, 145271897, '145271897'),
(59, 145271902, '145271902'),
(60, 145271906, '145271906'),
(61, 145271909, '145271909'),
(62, 145271910, '145271910'),
(63, 145271920, '145271920'),
(64, 129258388, '129258388');

--
-- Daten für Tabelle `placedomain`
--

INSERT INTO `placedomain` (`pid`, `did`) VALUES
(121799787, 1),
(127003463, 1),
(127010188, 1),
(127010189, 1),
(127010192, 1),
(127010225, 1),
(127010228, 1),
(129140556, 1),
(129140566, 1),
(129258388, 1),
(129357942, 1),
(129357943, 1),
(129357944, 1),
(129357945, 1),
(129357946, 1),
(129357947, 1),
(129357949, 1),
(129357950, 1),
(129357951, 1),
(129357952, 1),
(145126872, 1),
(145126874, 1),
(145126875, 1),
(145128359, 1),
(145128360, 1),
(145128365, 1),
(145128368, 1),
(145128369, 1),
(145128371, 1),
(145128378, 1),
(145128379, 1),
(145128380, 1),
(145130526, 1),
(145130527, 1),
(145130528, 1),
(145130529, 1),
(145130530, 1),
(145130531, 1),
(145130532, 1),
(145130533, 1),
(145130541, 1),
(145130542, 1),
(145130543, 1),
(145130544, 1),
(145132458, 1),
(145132460, 1),
(145132464, 1),
(145271897, 1),
(145271902, 1),
(145271906, 1),
(145271909, 1),
(145271910, 1),
(145271920, 1),
(145280191, 1),
(145280193, 1),
(145280204, 1),
(145280213, 1),
(149292698, 1),
(177247686, 1),
(221803079, 1);

--
-- Daten für Tabelle `placeinformation`
--

INSERT INTO `placeinformation` (`pid`, `iid`, `value`) VALUES
(127003463, 3, 'Informations-, Kommunikations- und Medienzentrum'),
(127003463, 4, 'library'),
(127010188, 3, 'Laborhalle 3D'),
(127010189, 3, 'Gewächshaus Fakultät 4'),
(127010192, 3, 'Reprographie'),
(127010225, 3, 'Umformer Station'),
(127010228, 3, 'Zentrale Einrichtung Sprachenzentrum'),
(129140566, 3, 'Baustofflabor'),
(129357942, 3, 'Lehrgebäude 10'),
(129357943, 3, 'Studentenwohnanlage Erich-Weinert-Straße'),
(129357944, 3, 'Studentenwohnanlage Universitätsstraße 1'),
(129357945, 3, 'Studentenwohnanlage Universitätsstraße 2'),
(129357946, 3, 'Studentenwohnanlage Universitätsstraße 3'),
(129357947, 3, 'Zwischenbau 1'),
(129357949, 3, 'Zwischenbau 3'),
(129357950, 3, 'Zwischenbau 4'),
(129357951, 3, 'Zwischenbau 6'),
(129357952, 3, 'Zwischenbau 5'),
(145126872, 3, 'Fakultät 3 / Sport'),
(145126874, 3, 'Laborgebäude 1B'),
(145126875, 3, 'Lehrgebäude 1A'),
(145128359, 3, 'Forschungs- und Materialprüfanstalt Cottbus'),
(145128360, 3, 'Garagenkomplex'),
(145128365, 3, 'Lehrgebäude 1C'),
(145128368, 3, 'Lehrgebäude 3'),
(145128369, 3, 'Lehrhalle 3G Verkehrtechnikhalle'),
(145128371, 3, 'Sporthalle 1'),
(145128380, 3, 'Hörsaal 3'),
(145130526, 3, 'Grundbau-Versuchshalle'),
(145130527, 3, 'Laborgebäude 4B'),
(145130528, 3, 'Laborhalle 3C'),
(145130529, 3, 'Laborhalle 4C'),
(145130530, 3, 'Lehrgebäude 3A'),
(145130531, 3, 'Lehrgebäude 3B'),
(145130532, 3, 'Lehrgebäude 4A'),
(145130533, 3, 'Panta Rhei Halle'),
(145132458, 3, 'Großer Hörsaal'),
(145132458, 4, 'entrance'),
(145132460, 3, 'Hauptgebäude'),
(145132464, 3, 'Zentralverwaltung'),
(145271902, 3, 'Lehrgebäude 2A'),
(145271906, 3, 'Lehrgebäude 2B'),
(145271909, 3, 'Lehrgebäude 2C'),
(145271910, 3, 'Lehrgebäude 2D'),
(145271920, 3, 'Zwischenbau Lehrgebäude 2C/D'),
(145280191, 3, 'Alte Schwimmhalle (geschlossen)'),
(145280193, 3, 'BTU Mensa'),
(145280193, 4, 'restaurant'),
(145280213, 3, 'Zentrales Hörsaalgebäude'),
(149292698, 3, 'Zwischenbau 2');

--
-- Daten für Tabelle `service`
--

INSERT INTO `service` (`id`, `name`, `sap`) VALUES
(1, 'testService', 'https://myService//'),
(2, 'pService', 'https://publicService//');

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
